FIG. 23. The constraints for TC and S17 in the presence of MSW oscillations when the existing data plus both hypothetical SNO NC and BOREXINO results are considered. This is a 4 parameter fit (2 MSW parameters plus TC and S17) to 5 data points (3 existing data plus 2 hypothetical results) with the luminosity constraint.