(a) Different SNO NC values (b) Different BOREXINO values

FIG. 10. The flux constraints for the combined SNO/Super-Kamiokande and BOREXINO results. The standard neutrino properties are assumed. The constraints are for (a) different SNO/Super-Kamiokande rates and (b) different BOREXINO rates.